如何开始使用S3Display

若想学习如何使用帮助，请按F1。

如果你不熟悉S3Display，那么你可能需要关于其使用的更多信息。下列主题可以帮助你入门：

S3Display可以做什么?

S3Display控制

切换显示


S3Display可以做什么?

S3Display让你选择所使用的显示设备，并让你调整这些设备上的不同设置。虽然你能打开和关闭哪些设备取决于你的系统上实际连接了什么设备，但是它们包括：

阴极射线管 - 这是标准的显示器。阴极射线管不存在可调的设置。

液晶显示器 - 这是膝上型电脑内建的显示面板，对于桌面系统将不会出现。用于液晶显示器的设置使你可以决定你的显示区域是否要尽量撑满液晶显示器。

DVI - 这是数字视频接口面板，也被称为平板。它的连接方式通常与阴极射线管相似，并用于取代阴极射线管。它与液晶显示器具有相同类型的设置。

电视 - 这是标准的电视机。电视设置允许你改变电视类型（例如NTSC或PAL）。根据视频芯片的不同，也可能存在用于决定连接系统和电视机时使用哪个端口的设置（复合或S-Video）。最后，还有一个高级按钮让你改变一些其他设置以便提高电视显示质量。

下一个：控制


控制

S3Display中有两套基本的控制。位于顶部的是显示设备，在此你可以打开或关闭不同的显示。你还可以使用显示设备来选择你可以改变其设置的设备。设备设置位于底部方框中。

显示设备: 你的系统所支持的所有显示设备都被显示在这个框中。你可以轻易地看到关于每个设备的多条重要信息。首先，该设备是否打开？如果设备的图片显示桌面的缩微版本，则那台设备处于打开状态。如果该设备显示一个黑暗的矩形，则它处于关闭状态。设备图像下面的复选框显示了相同的信息。第二，你可以知道一台设备是否与你的系统相连。如果设备没有连接，则一个大的红色X和一幅连接器的小图像会显示在设备图片的顶部，而设备会被置灰。

若想打开或关闭一台设备，点击设备图片下面的复选框。若想选中一台设备并察看它的设备，点击设备的图片。

设备设置: 该框显示了你对所选设备可以改变的不同设置。

下一个：切换显示


切换显示

你可以通过关闭你不想使用的设备、打开你想要的设备来切换你所使用的显示设备。注意，某些设备不能被同时打开。如果你想要的设备不能被启动，请首先尝试关闭另一台设备。

若想打开或关闭一台设备，点击设备图像下面的复选框。一个选中标志表示设备将被打开。一个空的复选框表示设备将被关闭。当你做了所需的改变之后，选择应用。此时，你将被提示确认你的选择。选择确定以继续。显示器可能会抖动一会儿，然后新的设备应该被启动。如果新的设备不是你所想要的，或者如果显示看上去不正常，则等待15秒钟，以前的设置将被恢复。否则，选择是以便保留新的设置。


显示该工具的版本。


点击此处以便打开该产品的web页。


显示OEM或产品标志。


控制器选项: 选择单个或两个显示控制器状态。


单个: 当系统被设置成单个控制器模式时，热键将仅在单个控制器列表内的模式间切换。


两个: 当系统被设置成两个控制器模式时，热键将仅在两个控制器列表内的模式间切换。


列出所有支持的设备组合。若想使用不同的设备组，请从列表中选择你想要的组合。


显示设备: 显示并选择打开的显示设备。打开的显示设备可以是一个或多个阴极射线管、电视、液晶显示器和DVI的组合。点击设备图像以便选择设备，点击复选框可以启动或禁用设备。


设备: 显示设备的状态。用鼠标右键点击每台设备以便获得更多信息。


设备：显示设备的状态。被启用设备的右下角也会显示一个小符号，用于表示哪个IGA（一级、二级等） 被用于输出该设备。用鼠标右键点击每个设备可以获得更多的信息。


阴极射线管: 显示阴极射线管的状态。如果阴极射线管没有连接，则阴极射线管图像和复选框将变成灰色。如果它已被连接但还未启动，则阴极射线管图像会显示一个空白屏幕。一台连接上的打开的阴极射线管会显示一幅桌面的图像。


液晶显示器: 显示液晶显示器的状态。如果液晶显示器没有连接，则液晶显示器图像和复选框将变成灰色。如果它已被连接但还未启动，则液晶显示器图像会显示一个空白屏幕。一台连接上的打开的液晶显示器会显示一幅桌面的图像。


DVI: 显示DVI的状态。如果DVI没有连接，则DVI图像和复选框将变成灰色。如果它已被连接但还未启动，则DVI图像会显示一个空白屏幕。一台连接上的打开的DVI会显示一幅桌面的图像。


电视: 显示电视的状态。如果电视没有连接，则电视图像和复选框将变成灰色。如果它已被连接但还未启动，则电视图像会显示一个空白屏幕。一台连接上的打开的电视会显示一幅桌面的图像。用鼠标右键点击电视会出现一个弹出菜单，从中可以快速访问一些电视调整功能。


阴极射线管2: 显示辅助阴极射线管的状态。如果该阴极射线管没有连接，则阴极射线管图像和复选框将变成灰色。如果它已被连接但还未启动，则阴极射线管图像会显示一个空白屏幕。一台连接上的打开的阴极射线管会显示一幅桌面的图像。


设备设置: 显示当前所选设备的可用设置。可用的设置会因设备类型而不同，并且有些设备没有可调的设置。


电视类型: 列出所支持的电视标准，例如NTSC、NTSC Japan或PAL。若想使用不同的电视标准，请从列表中选择你想要的标准。


电视输出: 列出所支持的电视输出连接器，例如复合或S-Video。若想使用不同的电视连接器，请从列表中选择你想要的。


高级: 点击此处以便打开所选设备的属性屏幕。


尺寸: 点击左边或右边的减号或加号来增加或减小阴极射线管图像的水平尺寸。点击上边和下边的加号和减号来拉长或缩短阴极射线管图像。点击中间的按钮将阴极射线管的尺寸设置成默认值。


该设备没有可调整的设置。


位置: 点击箭头以便向按扭方向移动阴极射线管屏幕上所显示图像的位置。点击中间的按钮可以将位置恢复成默认设置。


测试图案: 点击此处可以在测试图案中循环以便调整阴极射线管尺寸和位置。


扩展面板图像: 选中此处可以在当前所选的面板上（液晶显示器或DVI）扩展桌面源图像。取消对此的选中可以使桌面图像在面板上居中。


面板类型: 显示当前所选面板的类型和物理屏幕尺寸。


在任务条上显示托盘图标: 选中此处可以在系统托盘区中显示一个图标。用鼠标右键点击托盘图标可以快速访问一些S3Display功能。托盘图像将在Windows启动时自动载入。取消对此的选择会去除托盘图标，并阻止它在Windows启动时被载入。


抖动过滤器: 选中此处可以打开用于电视输出的抖动过滤器。抖动过滤器可以提高电视图像显示的质量。


抖动过滤器滑动块: 增加或减少系统所使用的过滤量，从最小（最左边）到最大（最右边）。


自适性闪光过滤器: 选择此复选框来打开自适性闪光过滤功能。该功能通过对适当区域的图像施以闪光过滤来加强电视图像的质量。这就减少了在对整个图像施以过滤时所产生的模糊现象。


自适性闪光过滤器滑动块: 拖动控制条来选择自适性闪光过滤功能的级数。对于较少需要使用该功能的图像，如电影，把控制条拖到靠左边；对于较多需要该功能的图像，如白底黑字的图像，则将控制条拖到靠右边。


Dot crawl 点蠕动: 选择此复选框来消除电视输出中的点蠕动情况。点蠕动指电视图像垂直边缘处的发亮现象。该功能仅适用于复合输出与NTSC制式的电视。


锐度: 当使用抖动过滤时，选中此处可以打开边缘对比度增强功能。


锐度滑动块: 拖动控制条来控制电视输出的清晰度，最左边清晰度最低，最右边则最高。


亮度: 拖动滑动块可以设置电视输出的亮度，从最暗（最左边）到最亮（最右边）。


对比度: 拖动滑动块可以设置电视输出的对比度，从最小（最左边）到最大（最右边）。


颜色: 拖动滑动块可以设置电视输出中的颜色数或饱和度，从最小（最左边）到最大（最右边）。


色彩: 拖动滑动块可以设置电视输出的色彩或色调，从绿（最左边）到紫（最右边）。


电视图像:  显示当前的电视尺寸和位置设置在电视屏幕上的样子。


尺寸:  点击左边或右边的减号或加号来增加或减小电视图像的水平尺寸。点击上边和下边的加号和减号来拉长或缩短电视图像。点击中间的按钮将电视图像的尺寸设置成默认值。


位置: 点击箭头以便向按扭方向移动电视屏幕上所显示图像的位置。点击中间的按钮可以将位置恢复成默认设置。


纵横比锁定:  将电视显示区域的纵横比锁定为4:3。在此情况下，只有垂直尺寸是可以调整的。


测试图案: 点击此处可以在测试图案中循环以便调整电视输出设置。


默认值: 点击此处可以将所显示的全部电视设置恢复成它们的默认值。


旋转: 按此处打开屏幕校准页面。


图例: 图例用于显示所选的屏幕校准。


旋转: 从可用的旋转模式中选择。


正常: 选择该模式即表示没有旋转。无旋转是横向模式。


90度: 选择该模式即表示90度旋转。显示区域会由正常模式顺时针转动90度。


180度: 选择该模式即表示180度旋转。显示区域会由正常模式顺时针转动180度。


270度: 选择该模式即表示270度旋转。显示区域会由正常模式顺时针转动270度。


刷新率：点击此处以打开刷新率调整页面。


桌面：显示所选设备的当前设置，例如屏幕尺寸、颜色设置和刷新率。


屏幕分辨率：显示所选设备的当前屏幕分辨率设置。


颜色质量：显示所选设备的当前颜色设置。


刷新率：显示所选设备的当前刷新率。


新的刷新率：列出所指定设备的可用刷新率。若要使用其他的刷新率，请从列表中选择一个。


版权说明

� 版权 2001-2002 S3 Graphics, Inc. 保留所有权利。   S3, DuoView, Streams Processor , Savage, Savage4, ProSavage, SuperSavage, 和Twister是S3 Graphics Inc.的商标。