S3Gamma Plus の操作を始めるには

ヘルプ の使い方を表示するには、F1 キーを押してください。

S3Gamma Plus に慣れていない場合は、操作方法に関する情報を参照してください。最初に次のトピックから始めることをお勧めします。

S3Gamma Plus では何ができるの?

S3Gamma Plus コントロール

表示を調整する


S3Gamma Plus では何ができるの?

S3Gamma Plus では、表示の暗さと明るさをいくつかの方法によって変更できます。

「ガンマ」は、表示の明るさと暗さの各領域に影響を与えずに色だけを変更します。中間の明るさを持つ色が最も影響を受けます。

「明るさ」は、すべての色に対して同じように影響します。明るさを調整すると、画面上全体がより明るくまたはより暗くなります。

「コントラスト」は、表示の明るい部分と暗い部分の差を変更します。コントラストが強いとは、画面の明るい部分と暗い部分との差がより大きいことを示します。

調整の各種類の違いを見分けるのに最も簡単な方法は、調整イメージを""カラー曲線""に設定することです。ガンマ、明るさ、およびコントラストを変更する時に各曲線を見て、各線がどう影響するかを見ます。

次へ:コントロール


コントロール

S3Gamma Plus は、ターンダイヤルの各種コントロールを使って調整できます。

ターンダイヤルのへこみ(くぼみ)の部分にカーソルを置き、マウスの左ボタンを押してドラッグします。正しい位置に置かれると、２つの小さなターン矢印が付いたカーソルが表示されます。

また、ターンダイヤルをクリックで選択し、左または右のカーソルキーを使って回すこともできます。ターンダイヤルは、選択されていない場合よりも選択された時の方が明るく表示され、濃い影が付きます。

ターンダイヤルは ３つあり、「ガンマ」「明るさ」「コントラスト」の調節が可能です。ターンダイヤルを回すとターンダイヤル内の数字が変化します。ターンダイヤルのデフォルト値はすべて 1.00 です。ターンダイヤルの選択時にマウスをダブルクリックする、またはスペースを押すとデフォルトの設定に戻ります。

次へ:表示を調整する


表示を調整する

最適な調整ができるように、多くの調整パターンが用意されています。 調整パターンリストから使用したいパターン選択してください。

「カラー曲線」は元の明るさ値 (横軸) に対する調整された明るさ値 (縦軸) を簡単なグラフで表します。これはガンマ、明るさ、およびコントラストの効果を見るのに最も適した方法です。

「調整イメージ」は、写真イメージです。イメージが ""実物""のように見えるように調整します。

「RGB カラー マップ」は、複数の四角が広い範囲の赤、緑、および青で示されます。これらはすべてほぼ同じ明るさです。RGB カラー ランプは、赤、緑、青、白の各色の暗から明の範囲を 4つの帯で表示します。理想的には、各帯の中でたくさんの異なる陰影が見えるのが望ましい結果です。

「カラー バー」と「(各色)塗り」の選択を使用することで、全色が正しくモニターに表示されることを確かめることができます。


このユーティリティのバージョンを表示します。


このユーティリティは、現在の設定 (色数) をサポートしていないため無効になっています。


この製品の Web ページを開くにはここをクリックしてください。


OEM または製品のロゴを表示します。


表示の調整を行うモニターのリストです。ミラーモニターモード時、リストからモニター (モニター 1 または モニター 2) を選択して各モニター別に表示の調整をすることができます。マルチモニターモード時は、このリストは無効になります。


サポートされている色設定をすべてリストし、現在選択されている色設定を表示します。色設定のためにガンマを変更するには、そのリストからモードを選択します。変更した効果を確認できるように、選択された色設定に表示が変更されます。「OK」、「適用」または「キャンセル」を選択するか、「表示プロパティ」の別のページに切り替えると、表示は元の設定に戻ります。


サポートされている表示モード (表示サイズと色数) をすべてリストし、現在選択されているモードを表示します。使用するモード用にガンマを変更するには、そのリストからモードを選択します。変更した効果を確認できるように、選択されたモードに表示が変更されます。「OK」、「適用」または「キャンセル」を選択するか、「表示プロパティ」の別のページに切り替えると、表示は元の設定に戻ります。


現在の表示モードを表示します。このモードはガンマ調整の結果の影響を受けます。例えば、"16 ビット カラー" のモードが表示された場合、ガンマ調整は 16 ビットの色すべてに影響を与えます。表示されたモードに解像度と表示色 ("1024 x 768 x 16" など) がある場合、実行するガンマ調整はその解像度と表示色に限定して適用されます。


下のドロップダウンリストで選択された調整パターンがここに表示されます。


調整パターンのリストを表示します。カラー曲線 はガンマ調整に対応した曲線を表示するもので、横軸は望ましい色値を示し、縦軸は実際に出力される値を示します。調整イメージは赤、緑、青の範囲を持つ写真イメージです。カラー ランプは、さまざまな色の暗から明への陰影のセレクションを示し、コントラストの調整に最適です。他のセレクションはカラー ランプまたは塗色を表示します。


表示ガンマを調整できるコントロールが含まれています。各コントロールには個別にヘルプ機能があります。ダイアログの一番上にある ? をクリックし、次に知りたい情報の項目をクリックします。


変更した内容が表示の赤のコンポーネントに適用されるようにするにはこのボタンを選択します。


変更した内容が表示の緑のコンポーネントに適用されるようにするにはこのボタンを選択します。


変更した内容が表示の青のコンポーネントに適用されるようにするにはこのボタンを選択します。


赤、緑、青の各色にリンクさせるにはこのボタンと選択します。リンクされている時は、ガンマ、明るさ値、またはコントラストを調整するとモニターの赤、緑、青の各コンポーネントはすべて一緒に変ります。このボタンが選択されていない時は、赤、緑、青の各色は別々に調整できます。


選択されたカラーチャンネルの「ガンマ」を調整します。ガンマの量を増やすには右回りに、減らすには左回りにダイヤルを回します。左と右のカーソルキーを使って回すこともできます。デフォルトの値に戻すにはダイヤルをダブルクリックする、またはスペースキーを押します。


選択されたカラーチャンネルの「明るさ」を調整します。明るさを増やすには右回りに、減らすには左回りにダイヤルを回します。左と右のカーソルキーを使って回すこともできます。デフォルトの値に戻すにはダイヤルをダブルクリックする、またはスペースキーを押します。


選択されたカラーチャンネルの「コントラスト」を調整します。コントラストを増やすには右回りに、減らすには左回りにダイヤルを回します。左と右のカーソルキーを使って回すこともできます。デフォルトの値に戻すにはダイヤルをダブルクリックする、またはスペースキーを押します。


モニターの赤の部分については、「調整」ドロップダウン リストで選択されている項目によって、ガンマ、明るさ値、またはコントラストをコントロールします。値を増やすには右回りに、減らすには左回りにダイヤルを回します。デフォルトの値に戻すにはこのダイヤルをダブルクリックします。


モニターの緑の部分については、「調整」ドロップダウン リストで選択されている項目によって、ガンマ、明るさ値、またはコントラストをコントロールします。値を増やすには右回りに、減らすには左回りにダイヤルを回します。デフォルトの値に戻すにはこのダイヤルをダブルクリックします。


モニターの青の部分については、「調整」ドロップダウン リストで選択されている項目に応じてガンマ、明るさ値、またはコントラストをコントロールします。値を増やすには右回りに、減らすには左回りにダイヤルを回します。デフォルトの値に戻すにはこのダイヤルをダブルクリックします。


ターンダイヤルで調整を行うカラーチャンネルを選択します。赤、緑、青が選択すると、選択した色のみを調整し、"RGB のリンク"を選択すると全色(赤、緑、青)を同時に調整します。


異なるカラーチャンネルに対して実行できる各種調整を表示します。ガンマ、明るさ値、またはコントラストを選択すると、各ターンダイヤルはガンマ、明るさ値、またはコントラストに対してだけ影響を与え、それぞれ各色 (赤、緑、青) を別々にコントロールします。


ガンマ、明るさ、およびコントラストの調整をそれぞれデフォルトに戻します。


ガンマ スキームの選択、保存、および削除などのコントロールが含まれています。


現在のガンマ設定を保存します。保存した設定は「スキーム」リストから選択し簡単に設定することができます。


「スキーム」ボックスで選択されているスキームを削除します。


システムに適用されているガンマ調整を変更できるスキームをリストします。スキームは、赤、緑、青に対して適用できるガンマ、明るさ、およびコントラストの調整を保存します。スキームを使用するには、このリストから名前を選択します。すべてのガンマ設定をデフォルトに戻すには、"(デフォルト)" というスキームを選択します。


スキーム名を入力します。ここで入力した名前が「スキーム」リストに表示されます。


フルスクリーンモードにするにはここをクリックします。フルスクリーンモードでは、デスクトップ画面全体に調整パターンが表示されます。フルスクリーンモードにはヘルプは参照できません。フルスクリーンモードを解除するには"Esc" キーを押します。


著作権情報

ｩ Copyright 2004-2005 S3 Graphics Co., Ltd. すべての権利は留保されています。S3、DuoView, Streams Processor、 Savage、Savage4、ProSavage、SuperSavage、および Twister は S3 Graphics Inc. の登録商標です。


使用できるガンマ　スキーマをリストします。スキーマはガンマ、明るさ、コントラストを赤、緑、青それぞれ調整し保存できます。保存した設定は呼び出すことができます。デフォルトボタンでデフォルト設定に戻ります。