The Program Neighborhood Connection Center Window

The Program Neighborhood Connection Center Window shows the currently open ICA sessions.

Click the following for more information:

  ICA Connections

  Disconnect button

  Full Screen button

  Properties button

  Logoff button

  Security button

  Terminate button

See also

The Program Neighborhood Connection Center Overview


The Program Neighborhood Connection Center Overview

The Citrix ICA Win32 Client supports running published applications in seamless windows on Windows NT 3.51 Service Pack 3 or greater and Windows 9x/2000 client computers.

Seamless windows are ICA Client session windows containing published applications that client computer users have configured to run in seamless mode. A seamless windows session runs in a resizable window. Because seamless windows contain only published applications, seamless ICA connections must be network (non-serial) connections. Seamless windows ICA connections also differ from non-seamless connections in the number of published applications that can be run in a single ICA session.

When using seamless windows, users can make a single ICA connection to a MetaFrame server that has multiple published applications configured and then run the various published applications all in the same ICA session. Each published application appears in its own resizable window and behaves like any locally run Windows application.

The Program Neighborhood Connection Center displays all ICA connections established from this client.

Note

All server and application functionality provided by buttons is also provided by the appropriate context menu activated by a right mouse click.


Active Connections
ICA Connections

The ICA Connections field displays a list of active ICA sessions. Each server entry in the list represents an ICA session. For each seamless session, below each server entry, a list of the published applications you are running on that server appears.


Logoff Button
Logoff

Terminates all published applications on the selected server and closes the ICA session.


Terminate Button
Terminate

The selected published application terminates. If you have other published applications running on that server, the ICA session remains active and the published applications remain running. If no other published applications are running on the server connection, the ICA connection to the server is terminated.


To terminate an individual published application connection

Select a published application and click Terminate. The published application terminates. If you have other published applications running on that server, the ICA session remains active and the published applications remain running. If no other published applications are running on the server connection, the ICA connection to the server is terminated.


To logoff a MetaFrame server
To logoff a server

Select a server entry from the list and click Logoff. The ICA session is ended and all published applications you are running on that server are terminated.


To exit the Program Neighborhood Connection Center


Full Screen Button
Full Screen

The currently selected seamless connection switches to a full screen session.  Pressing SHIFT-F2 returns this session to seamless mode.


Disconnect Button
Disconnect

Disconnects the currently selected server session.


Properties Button
Properties

Displays ICA communication statistics for the selected server.  User name, server name, and encryption level are also displayed for the currently selected session.


ICA Client File Security Dialog Box

This dialog box handles access permissions of published applications to files located on your mapped local drive. The settings do not affect the application’s permissions for access to files located on the server.

Choose No Access to deny the published application any
access to your local files.

Choose Read Access to give the published application read-only
access to your associated local files.

Choose Full Access to give the published application read-write
access to your associated local files.

Note

Only the Full Access option allows you to save changes to your local drive.


Security Button

Brings up the ICA Client File Security dialog box.

See also

ICA Client File Security dialog box